Tetraeder ( max. Kante = 10.5 cm )

Hexaeder ( max. Kante = 6.6 cm )

Oktaeder ( max. Kante = 7.9 cm )

Dodekaeder ( max. Kante = 3.5 cm )

Ikosaeder ( max. Kante = 5.0 cm )